         180           8
   7.48538396325936        7.09175130025860        6.83033906175092     
   6.61772900790038        6.38700713806757        6.13808132603254     
   5.91824906814732        5.52462985775540     
  -9.42005538807564       -9.33359260531254       -9.01131623837872     
  -8.66370220881107       -8.38397681537715       -8.07689140172994     
  -7.75251395178376       -7.63171824919820     
 -8.643566909063422E-003  0.000000000000000E+000
   1.00975825683245       0.000000000000000E+000
   1.01355593679847       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
