         180           8
  0.808771383373842       0.590844353482846       0.382187071132362     
  0.177229524782943       8.658672915766736E-003 -0.185276096623265     
 -0.397677265249590      -0.463299328071308     
  -8.67122511335737       -8.50029966261626       -8.27487898942632     
  -8.04749405533561       -7.74155967950700       -7.44837288787099     
  -7.21359087950998       -6.91269271215335     
 -8.950978873444152E-003  0.000000000000000E+000
   1.01003746854210       0.000000000000000E+000
   1.01391154953317       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
