         180           8
   1.59909292731387        1.22822727331975        1.02384800625209     
  0.898536034416156       0.766809570898969       0.599115256419263     
  0.473308765651981       0.327169713874433     
  -8.62212503355017       -8.52125402818514       -8.34459254447618     
  -8.05903214136885       -7.74909877467684       -7.48777878052436     
  -7.28047416104619       -7.09443919947522     
 -8.616640267564870E-003  0.000000000000000E+000
   1.00951499204039       0.000000000000000E+000
   1.01349352364060       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
