         180           3
   6.08488595040901        7.56542132174591        9.47603822500513     
  -8.12285496645320       -7.10871633989430       -6.40213373831122     
  1.608948450779696E-003  0.000000000000000E+000
  0.987187455048136       0.000000000000000E+000
  0.984404066689173       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
