         180           3
   7.25284673947274        8.37407431041375        9.99271237927327     
  -9.44709464110921       -8.37142282132875       -7.51045666859971     
  1.833887340154439E-003  0.000000000000000E+000
  0.987187267498104       0.000000000000000E+000
  0.984496353632692       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
