         180           8
   4.61256040167357        4.35093506229917        4.14930431536899     
   3.94667505980714        3.67362380587541        3.44877585757138     
   3.27319438126214        3.04499276822465     
  -9.44728078568722       -9.18183411664950       -8.87360688547133     
  -8.60078980144767       -8.29310530527778       -7.93256251017482     
  -7.60022699935707       -7.27727671363421     
 -8.557683133947638E-003  0.000000000000000E+000
   1.00997339498969       0.000000000000000E+000
   1.01346626433355       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
