         180           8
   2.27363506681174        1.94513617730005        1.77677087414587     
   1.61490279060853        1.44941352875993        1.27225735714430     
   1.17959446248648        1.07290803668611     
  -9.94414425761031       -9.70249294106069       -9.42986777327254     
  -9.20076304358912       -9.01488614823931       -8.86496426060957     
  -8.67697344905187       -8.35132358927362     
 -8.649085914590536E-003  0.000000000000000E+000
   1.00962914539205       0.000000000000000E+000
   1.01354052865960       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
