         180           3
   5.13403820282815        6.68597054944991        8.32559354945710     
  -10.8381179717167       -10.1954439748606       -8.87812192543175     
  1.500453212518419E-003  0.000000000000000E+000
  0.987257146692060       0.000000000000000E+000
  0.984758909561985       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
