         180           8
 -7.395247769924800E-002 -0.325294731162918      -0.459015876540526     
 -0.573103592239785      -0.775816808632868      -0.994282482414024     
  -1.22338174892056       -1.29817350003986     
  -10.1242784541872       -9.81615979574009       -9.58786720564476     
  -9.31441101722026       -9.03035949177634       -8.76472972503753     
  -8.51457799992604       -8.19463563776626     
 -8.780799810413688E-003  0.000000000000000E+000
   1.00946613926054       0.000000000000000E+000
   1.01306963336221       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
