         180           3
   5.03452645906930        6.58468008484652        8.33800015410268     
  -10.5025169989889       -9.74396860804121       -8.61734309704802     
  1.311449431630604E-003  0.000000000000000E+000
  0.986993585076463       0.000000000000000E+000
  0.984335240070508       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
