         180           8
  0.751022184810385       0.530284036281700       0.263255794245523     
  7.237080336772067E-002 -6.679911514309238E-002 -0.215812011792106     
 -0.362709123863514      -0.529344788653955     
  -10.3787599939894       -10.1914508769543       -9.93934972169048     
  -9.75679556858565       -9.54256939835193       -9.31460802147670     
  -9.03114381196662       -8.51294024082181     
 -8.800819275675274E-003  0.000000000000000E+000
   1.00906605978447       0.000000000000000E+000
   1.01288815450630       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
