         180           8
   2.11201044934962        2.12547157975049        1.97812524913599     
   1.79572072099359        1.65727671151353        1.53272081763099     
   1.43279962575888        1.52096710444704     
  -9.91677613514443       -10.1655391724697       -10.0319958081359     
  -9.77941221513948       -9.45957877501386       -9.08745145035748     
  -8.69305087247403       -8.36331990827714     
 -8.773959752592016E-003  0.000000000000000E+000
   1.00953166741450       0.000000000000000E+000
   1.01320664339801       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
