         180           8
   6.35910253109748        5.60590563682167        4.93503945355492     
   4.21834584720964        3.46585357258161        2.74945357692167     
   2.07214940154778        1.45748996070104     
  -7.05971850798095       -7.10074972143292       -7.15567987747275     
  -7.27575252871868       -7.44514420032868       -7.63091716132192     
  -7.75204154292156       -7.83059124112202     
 -8.816492355594785E-003  0.000000000000000E+000
   1.01003421578117       0.000000000000000E+000
   1.01400022977851       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
