         180           8
   4.57155199491614        3.99047515989765        3.24511803696258     
   2.50364762315777        1.75096093334775        1.01061424764973     
  0.311171693492477      -0.242978164590813     
  -6.85684124143474       -6.79340642173627       -6.74196322866120     
  -6.83459931036520       -7.00601783716939       -7.19698425649653     
  -7.33297045897084       -7.22170554702278     
 -8.595365413248396E-003  0.000000000000000E+000
   1.00930668437942       0.000000000000000E+000
   1.01354761690681       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
