         180           8
  0.241331659520997      -0.472931908757103       -1.28266221645056     
  -2.10641327744947       -2.97804954717173       -3.76937431850881     
  -4.41337391649708       -5.01225300062002     
  -7.18144818717250       -7.22552559445427       -7.21790540441985     
  -7.21918757345598       -7.26509056182631       -7.31193524543302     
  -7.51882336275614       -7.60812364565109     
 -9.183792494987934E-003  0.000000000000000E+000
   1.00925919417160       0.000000000000000E+000
   1.01318842113993       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
