         180           8
  -6.06508058941217       -6.27286310618913       -6.43626615410915     
  -6.76162304626639       -7.02867821500322       -7.19448394871682     
  -7.23372079643075       -7.20846351929675     
  -7.13649533006501       -7.11464293692006       -6.95946338703328     
  -6.81147913719270       -6.70676110157270       -6.81385619044594     
  -7.08848587070565       -7.47882839079133     
 -9.476935100744363E-003  0.000000000000000E+000
   1.00956592087914       0.000000000000000E+000
   1.01407799375574       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
