         180           8
  -6.51087736531075       -6.48559811088612       -6.42239485205788     
  -6.35830769240426       -6.29752431141708       -6.33168367603964     
  -6.36731378208899       -6.20924359424502     
  -11.6429632335159       -10.8768099427593       -10.5217218101294     
  -10.3309302777376       -10.2247483203446       -10.3305435798805     
  -10.5249964546309       -10.5875555045274     
 -1.025073615505747E-002  0.000000000000000E+000
   1.01014278564121       0.000000000000000E+000
   1.01463887709441       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
