         180           3
   12.7520619610455        9.90480458330753        7.00085212687906     
  -9.85119748440007       -10.5900969066636       -11.1459895957612     
  1.429389041560263E-003  0.000000000000000E+000
  0.987453452997719       0.000000000000000E+000
  0.985272092021794       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
