         180           8
   6.13438385705668        5.55904186541091        4.85286141625155     
   4.06767642305680        3.41764159631655        2.77302303175253     
   2.07164066594309        1.39918753329436     
  -8.93770480591538       -9.23212393502198       -9.35879452418255     
  -9.52440676519007       -9.73007926740625       -9.95677347069670     
  -10.2144261457912       -10.4606325498813     
 -9.671290387896306E-003  0.000000000000000E+000
   1.01064826749008       0.000000000000000E+000
   1.01483193089016       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
