         180           8
   1.29708755438907        1.02143512299440       0.875728515068936     
  0.661231185827602       0.548744477334638       0.397369249330741     
  0.218847936209943       0.158059961298819     
  -13.8724349012241       -13.6656782716378       -13.4554166985535     
  -13.2381018823909       -13.0173447950222       -12.8027856746378     
  -12.5257715271978       -12.2672545459250     
 -9.943954234116297E-003  0.000000000000000E+000
   1.01070707058635       0.000000000000000E+000
   1.01519798232323       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
