         180           8
  -1.16438237140801       -1.57418553955174       -1.74482436155072     
  -1.88090897201621       -1.96603930038131       -1.99615256877981     
  -2.08660259197344       -2.32516171888046     
  -7.91813719165171       -7.73615585525118       -7.33805383515911     
  -7.10779494340213       -6.95304471667846       -6.71130956079657     
  -6.51800433483664       -6.36759564740950     
 -8.778369905194950E-003  0.000000000000000E+000
   1.00920600133708       0.000000000000000E+000
   1.01350108484093       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
