         180           8
  -1.02023425369213       -1.31143665269628       -1.56507229106384     
  -1.72991144745448       -1.86023405411744       -1.91658385887901     
  -2.01543061331554       -2.06510538650662     
  -8.16531389907651       -7.94627474011082       -7.70905936383659     
  -7.42618445304471       -7.18315099072584       -6.99739335326016     
  -6.77474353159830       -6.51367320480155     
 -8.835567438609537E-003  0.000000000000000E+000
   1.00928104689999       0.000000000000000E+000
   1.01344307189040       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
