         180           3
   4.55004994579654        6.19255361360486        8.08941514787719     
  -6.55338896294524       -5.42749518368028       -4.49486270408708     
  1.140523434564836E-003  0.000000000000000E+000
  0.987078949796479       0.000000000000000E+000
  0.984254234446749       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
