         180           8
  -1.48604535336680       -1.63446344811683       -1.79280621356773     
  -1.96013169606820       -2.07564160937742       -2.15281771284676     
  -2.27425345332240       -2.46709043391322     
  -8.10760411544583       -7.96844518757232       -7.66801960182751     
  -7.40176183822831       -7.17624484824728       -6.95183509126205     
  -6.72605072396893       -6.49509369620038     
 -8.863565489859801E-003  0.000000000000000E+000
   1.00936506524921       0.000000000000000E+000
   1.01348839517547       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
