         180           8
 -0.539597134681804      -0.800185463180061       -1.02018865456231     
  -1.23178450341689       -1.36932891480766       -1.45959730288365     
  -1.57159329565588       -1.73818561908757     
  -8.30514991374630       -8.11959090847450       -7.90657646041801     
  -7.68805716208464       -7.46050776258856       -7.21103426829260     
  -6.94692190700244       -6.67064187066076     
 -8.915362011544322E-003  0.000000000000000E+000
   1.00989279372285       0.000000000000000E+000
   1.01376098726004       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
