         180           3
   4.48017625366397        6.06878485120504        7.70838314261520     
  -7.45106934303646       -6.46880358163149       -4.84644845553279     
  1.190363065087253E-003  0.000000000000000E+000
  0.986955242187574       0.000000000000000E+000
  0.984238698143061       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
