         180           8
  -1.19284068498401       -1.49641548547452       -1.67872054039864     
  -1.84050287341939       -1.97007992361114       -2.07442315659737     
  -2.21296292907170       -2.45569482332080     
  -8.35027277648710       -8.25256576837483       -8.01316916886502     
  -7.66720720828539       -7.35250223769340       -7.08418580383155     
  -6.88940158733859       -6.75993916031635     
 -8.700508854620967E-003  0.000000000000000E+000
   1.00929200480127       0.000000000000000E+000
   1.01336498417288       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
