         180           8
 -0.835099935772351       -1.11166372310870       -1.39111271012060     
  -1.53050688293802       -1.58475100867834       -1.68466334547165     
  -1.81662628354977       -1.85955965646071     
  -8.37328767544664       -8.24363907577250       -8.05318128172886     
  -7.89159374084588       -7.64049962705068       -7.36704531207774     
  -7.12615415663644       -6.93925749140464     
 -8.730067141069808E-003  0.000000000000000E+000
   1.00921208300733       0.000000000000000E+000
   1.01359670060184       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
