         180           8
  -1.13590758080324       -1.30225623253486       -1.51793249644136     
  -1.64223439243316       -1.83817284765165       -2.15136036564187     
  -2.33153578029445       -2.50506104526918     
  -8.32496230347226       -8.00518580009692       -7.71448951898169     
  -7.49064662178112       -7.27632326643384       -7.13519282789208     
  -7.06525868167207       -6.81716407776009     
 -8.746745342712522E-003  0.000000000000000E+000
   1.00945073230733       0.000000000000000E+000
   1.01358932997893       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
