         180           8
  -7.53288092054361       -7.85936012258461       -7.98985409216635     
  -8.22467953352877       -8.40427432925099       -8.65792101720517     
  -8.85510080406551       -8.88778328525845     
  -6.60140950416766       -6.24443463380026       -6.27976859111880     
  -6.25723935819345       -6.28591103565271       -6.30085692721765     
  -6.28818327666074       -6.24380324660039     
 -9.052979477122447E-003  0.000000000000000E+000
   1.00942401992771       0.000000000000000E+000
   1.01377624404000       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
