         180           8
 -0.991382783250862       -1.19490118418622       -1.43236707858028     
  -1.58553569804796       -1.69736191858874       -1.83277969391696     
  -1.96484709913144       -2.11742596028587     
  -8.36190763956628       -8.23094887525344       -8.00743083547087     
  -7.74322107724925       -7.50242366860626       -7.23303639292071     
  -6.93274435944779       -6.70183121718538     
 -8.803095819125445E-003  0.000000000000000E+000
   1.00938993831840       0.000000000000000E+000
   1.01348298906289       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
