         180           8
   2.39603584812759        1.71855937990432        1.05543313473510     
  0.313751390801811      -0.391462587293365       -1.07111499013068     
  -1.73155104227241       -2.22739276921906     
  -6.08006345467310       -6.19720905712242       -6.29465434056380     
  -6.41081282905046       -6.54068081760364       -6.73530811443779     
  -6.88814791255585       -6.99587647133372     
 -8.900981786316080E-003  0.000000000000000E+000
   1.00952519239622       0.000000000000000E+000
   1.01374154179068       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
