         180           8
  -1.30670323626397       -1.58643696129790       -1.74348564884286     
  -1.75392913011971       -1.80421650928524       -1.90457181971651     
  -1.96970161294063       -2.13964706885483     
  -8.32959207171072       -8.30857516099213       -8.12414786754630     
  -7.81073626024978       -7.49072525545250       -7.23180775316925     
  -7.00999015365537       -6.91667341452058     
 -8.768236467498152E-003  0.000000000000000E+000
   1.00941976294007       0.000000000000000E+000
   1.01341592154423       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
