         180           8
 -0.605457072352558      -0.827832121222170       -1.15884803854631     
  -1.40509643861509       -1.58512584582104       -1.79612744982915     
  -2.03868824931309       -2.12717711831638     
  -9.03928226460187       -8.65404543785447       -8.33613832089981     
  -8.02590610318297       -7.71286483058665       -7.36640925111632     
  -7.09832079145050       -6.81702465002321     
 -8.867555460493863E-003  0.000000000000000E+000
   1.00960590456955       0.000000000000000E+000
   1.01335768519139       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
