         180           8
 -0.438300195852236      -0.742443226328489       -1.03156846807507     
  -1.28298217113448       -1.38870586980672       -1.51301650757700     
  -1.67140666902127       -1.85328879233339     
  -8.61192188745827       -8.40547460162214       -8.18124224060684     
  -8.00531329212857       -7.73884434516659       -7.39928977410668     
  -7.17751987400512       -6.92953161593477     
 -8.764295470435989E-003  0.000000000000000E+000
   1.00928299772908       0.000000000000000E+000
   1.01332660234862       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
