         180           8
  -1.09328301197355       -1.43846943164289       -1.81350604519240     
  -2.11597275725187       -2.35900307181623       -2.61597229945376     
  -2.81922266860219       -2.92019022904966     
  -8.39797859451573       -8.69613974242805       -8.89505296398638     
  -9.04747275913523       -9.14423367439683       -9.19026051237454     
  -9.14940032816583       -9.17028755065702     
 -8.704637276576572E-003  0.000000000000000E+000
   1.00904235157744       0.000000000000000E+000
   1.01307977119526       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
