         180           3
   6.02115458623109        5.07189485598500        3.91554500862018     
  -2.31339672358930       -2.43874046910745       -1.43359731134124     
  2.841340014388922E-004  0.000000000000000E+000
  0.986951778684343       0.000000000000000E+000
  0.984218258545071       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
