         180           8
  -6.46944541834715       -6.71221083309930       -6.88986876558010     
  -7.06671335379828       -7.21066835409569       -7.41188342390322     
  -7.50746830236305       -7.61602559816165     
  -6.55071466756911       -6.64408845896158       -6.82512455193810     
  -6.99850322762571       -6.99820990204033       -6.95185238567307     
  -6.88739798375559       -6.84932205095213     
 -8.796720769343307E-003  0.000000000000000E+000
   1.00890353469359       0.000000000000000E+000
   1.01246717881193       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
