         180           8
  -6.10208235454304       -6.27875988650436       -6.46062837037521     
  -6.61884051236027       -6.76607339692920       -7.09688807120802     
  -7.31777637489099       -7.37719108240277     
  -6.87720962924137       -6.97894707052867       -6.96633297046479     
  -7.04232712099023       -7.20187243852466       -7.21987936524300     
  -7.12625562150639       -7.01874584891643     
 -8.850350332417224E-003  0.000000000000000E+000
   1.00888978832253       0.000000000000000E+000
   1.01300166484470       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
