         180           3
   6.41323673720268        5.28752424000762        3.80223987121584     
  -6.55009041340660       -5.69069110463187       -7.02321130808749     
  1.112184100666327E-003  0.000000000000000E+000
  0.986939873968106       0.000000000000000E+000
  0.984241706872239       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
