         180           8
  0.436493238217384      -1.453688647581346E-002 -0.348396052229076     
 -0.632222611301604      -0.908598236865708       -1.54048933314995     
  -2.06452988652663       -2.14863869030756     
  -8.08227639237879       -8.21257071652834       -8.16086173432456     
  -8.01010702912096       -8.09688937747612       -8.61094369639158     
  -8.94569259829867       -9.17142394498202     
 -8.594855614038910E-003  0.000000000000000E+000
   1.00947971019711       0.000000000000000E+000
   1.01338453977527       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
