         180           8
   4.64163302316313        3.36448919320672        2.47957464321310     
   1.75044312256359        1.02156537813089       0.336525358652516     
 -0.348265384742053      -0.910278087762565     
  -3.14357164395452       -4.20987905569622       -5.03094504770167     
  -5.41978184655480       -5.66423745173674       -5.84710548710306     
  -6.00300530881139       -6.12553784774028     
 -8.749147812524978E-003  0.000000000000000E+000
   1.01006357048094       0.000000000000000E+000
   1.01453486277938       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
