         180           3
   10.9696611278567        9.16755292108573        7.07845090378670     
  0.892219045127179      -7.271906395721739E-002  0.681315649247082     
  3.569451446619863E-004  0.000000000000000E+000
  0.987160980995640       0.000000000000000E+000
  0.984781362448424       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
