         180           8
  -3.60674762298110       -4.24790040784491       -4.94279426692936     
  -5.54811484834563       -6.04211267583376       -6.48947139537034     
  -6.92251198130920       -7.37688375232621     
  -3.87426052490062       -3.96077397242523       -4.17415207369925     
  -4.44826286478805       -4.58433621083425       -4.60699936992150     
  -4.57473461177979       -4.50481110425775     
 -8.909630857973087E-003  0.000000000000000E+000
   1.00971826495310       0.000000000000000E+000
   1.01364942664813       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
