         180           8
  -3.33888474254783       -3.95341919903635       -4.61207773923818     
  -5.32733576474663       -5.98878910536837       -6.54113080468242     
  -7.03766436074938       -7.42984101261270     
  -4.31382292313534       -4.23285600506564       -4.15151593297417     
  -4.12850973294739       -4.14686987605502       -4.32558675088014     
  -4.64578779483495       -4.80396241663246     
 -8.903874423093639E-003  0.000000000000000E+000
   1.00942232952834       0.000000000000000E+000
   1.01363958368376       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
