         180           8
 -0.443001947968423       -1.08234900505753       -1.78799570118985     
  -2.52215894605600       -3.27361814952051       -4.01682373841033     
  -4.72471268206965       -5.41700621577148     
  -4.23046737136854       -4.37688273790554       -4.47664433294158     
  -4.64050822616496       -4.78317177029810       -4.81975503244688     
  -4.96567639234951       -5.34802221940149     
 -8.816019764553719E-003  0.000000000000000E+000
   1.00948955147889       0.000000000000000E+000
   1.01374436748692       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
