         180           3
   13.0453424977060        10.3218337674908        7.98573906733513     
 -8.722547213405552E-002 -0.516734829709749       0.944055539951116     
  4.472116801350301E-004  0.000000000000000E+000
  0.987020575253062       0.000000000000000E+000
  0.984551013610717       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
