         180           8
   1.91306422603356        1.11917953575515       0.369815189494226     
 -0.364823285842760       -1.02238373994353       -1.57628582702471     
  -2.22012537499157       -2.89180398221377     
  -3.06271479244898       -3.11259077830023       -3.15961804203555     
  -3.37521743784127       -3.56516868799371       -3.71932973461373     
  -3.96696092993133       -4.10270658109869     
 -9.332597765528902E-003  0.000000000000000E+000
   1.00944468286318       0.000000000000000E+000
   1.01331966649373       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
