         180           8
  0.808099315195645       0.396519721716936       0.141363324144976     
 -0.182433662124179      -0.408332500243581      -0.592333135231699     
 -0.544110819108812      -0.861025244560790     
  -3.16248279047961       -2.85708879285806       -2.46338215394575     
  -2.21130885813847       -2.07856023534737       -1.74699770268830     
  -1.22959981736379      -0.878220108508019     
 -8.019171462135821E-003  0.000000000000000E+000
   1.00981678466210       0.000000000000000E+000
   1.01372897860295       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
