         180           8
 -0.282254339509311      -0.632358186993448      -0.874058840885457     
  -1.04277375677711       -1.37700047921171       -1.61679963259764     
  -1.68923869780872       -2.07881293769098     
  -2.72108064597681       -2.59724584317538       -2.48104568163034     
  -2.14361085472522       -1.72796976093180       -1.47296805259952     
  -1.28169256235234       -1.14901535342125     
 -7.968926481252366E-003  0.000000000000000E+000
   1.00947330054776       0.000000000000000E+000
   1.01350427680521       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
